import { Chip } from '@mui/material'
import { ShieldCheck } from 'lucide-react'
import type { ConfidenceLevel } from '../../domain/enums'
import { DS_COLORS, scoreToConfidenceLevel } from '../../lib/ds'
import { CONFIDENCE_LABELS } from '../../lib/constants'

interface ConfidenceBadgeProps {
  level?: ConfidenceLevel
  score?: number
  size?: 'small' | 'medium'
}

export function ConfidenceBadge({ level, score, size = 'small' }: ConfidenceBadgeProps) {
  const resolved: ConfidenceLevel =
    level ?? (score !== undefined ? scoreToConfidenceLevel(score) : 'MEDIUM')
  const { bg, fg } = DS_COLORS.confidence[resolved]
  const scoreLabel = score !== undefined ? ` (${Math.round(score * 100)}%)` : ''
  const label = `${CONFIDENCE_LABELS[resolved] ?? resolved}${scoreLabel}`
  return (
    <Chip
      size={size}
      label={label}
      icon={<ShieldCheck size={11} color={fg} />}
      aria-label={`Konfidenz: ${label}`}
      sx={{
        bgcolor: bg,
        color: fg,
        border: 'none',
        fontWeight: 600,
        fontSize: '0.7rem',
        '& .MuiChip-icon': { ml: 0.5 },
      }}
    />
  )
}
